import VTSequence from "@/components/VTSequence";

# Horizontal Position Absolute (HPA)

<VTSequence sequence={["CSI", "Px", "`"]} />

This sequence performs [cursor position (CUP)](/vt/cup) with `x` set
to the parameterized value and `y` set to the current cursor position.
There is no additional or different behavior for using `HPA`.
