LIBRARY AMDHIP64
EXPORTS
__hipPopCallConfiguration
__hipPushCallConfiguration
__hipRegisterFatBinary
__hipRegisterFunction
__hipRegisterManagedVar
__hipRegisterSurface
__hipRegisterTexture
__hipRegisterVar
__hipUnregisterFatBinary
hipApiName
hipArray3DCreate
hipArrayCreate
hipArrayDestroy
hipBindTexture
hipBindTexture2D
hipBindTextureToArray
hipBindTextureToMipmappedArray
hipChooseDevice
hipConfigureCall
hipCreateChannelDesc
hipCreateSurfaceObject
hipCreateTextureObject
hipCtxCreate
hipCtxDestroy
hipCtxDisablePeerAccess
hipCtxEnablePeerAccess
hipCtxGetApiVersion
hipCtxGetCacheConfig
hipCtxGetCurrent
hipCtxGetDevice
hipCtxGetFlags
hipCtxGetSharedMemConfig
hipCtxPopCurrent
hipCtxPushCurrent
hipCtxSetCacheConfig
hipCtxSetCurrent
hipCtxSetSharedMemConfig
hipCtxSynchronize
hipDestroyExternalMemory
hipDestroyExternalSemaphore
hipDestroySurfaceObject
hipDestroyTextureObject
hipDeviceCanAccessPeer
hipDeviceComputeCapability
hipDeviceDisablePeerAccess
hipDeviceEnablePeerAccess
hipDeviceGet
hipDeviceGetAttribute
hipDeviceGetByPCIBusId
hipDeviceGetCacheConfig
hipDeviceGetLimit
hipDeviceGetName
hipDeviceGetP2PAttribute
hipDeviceGetPCIBusId
hipDeviceGetSharedMemConfig
hipDeviceGetStreamPriorityRange
hipDevicePrimaryCtxGetState
hipDevicePrimaryCtxRelease
hipDevicePrimaryCtxReset
hipDevicePrimaryCtxRetain
hipDevicePrimaryCtxSetFlags
hipDeviceReset
hipDeviceSetCacheConfig
hipDeviceSetSharedMemConfig
hipDeviceSynchronize
hipDeviceTotalMem
hipDriverGetVersion
hipDrvMemcpy2DUnaligned
hipDrvMemcpy3D
hipDrvMemcpy3DAsync
hipEnableActivityCallback
hipEventCreate
hipEventCreateWithFlags
hipEventDestroy
hipEventElapsedTime
hipEventQuery
hipEventRecord
hipEventSynchronize
hipExtGetLinkTypeAndHopCount
hipExtLaunchKernel
hipExtLaunchMultiKernelMultiDevice
hipExtMallocWithFlags
hipExtModuleLaunchKernel
hipExtStreamCreateWithCUMask
hipExtStreamGetCUMask
hipExternalMemoryGetMappedBuffer
hipFree
hipFreeArray
hipFreeHost
hipFreeMipmappedArray
hipFuncGetAttribute
hipFuncGetAttributes
hipFuncSetAttribute
hipFuncSetCacheConfig
hipFuncSetSharedMemConfig
hipGLGetDevices
hipGetChannelDesc
hipGetCmdName
hipGetDevice
hipGetDeviceCount
hipGetDeviceFlags
hipGetDeviceProperties
hipGetErrorName
hipGetErrorString
hipGetLastError
hipGetMipmappedArrayLevel
hipGetSymbolAddress
hipGetSymbolSize
hipGetTextureAlignmentOffset
hipGetTextureObjectResourceDesc
hipGetTextureObjectResourceViewDesc
hipGetTextureObjectTextureDesc
hipGetTextureReference
hipGraphAddDependencies
hipGraphAddEmptyNode
hipGraphAddKernelNode
hipGraphAddMemcpyNode
hipGraphAddMemcpyNode1D
hipGraphAddMemsetNode
hipGraphCreate
hipGraphDestroy
hipGraphExecDestroy
hipGraphExecKernelNodeSetParams
hipGraphGetNodes
hipGraphGetRootNodes
hipGraphInstantiate
hipGraphKernelNodeGetParams
hipGraphKernelNodeSetParams
hipGraphLaunch
hipGraphMemcpyNodeGetParams
hipGraphMemcpyNodeSetParams
hipGraphMemsetNodeGetParams
hipGraphMemsetNodeSetParams
hipGraphicsGLRegisterBuffer
hipGraphicsMapResources
hipGraphicsResourceGetMappedPointer
hipGraphicsUnmapResources
hipGraphicsUnregisterResource
hipHccModuleLaunchKernel
hipHostAlloc
hipHostFree
hipHostGetDevicePointer
hipHostGetFlags
hipHostMalloc
hipHostRegister
hipHostUnregister
hipImportExternalMemory
hipImportExternalSemaphore
hipInit
hipInitActivityCallback
hipIpcCloseMemHandle
hipIpcGetEventHandle
hipIpcGetMemHandle
hipIpcOpenEventHandle
hipIpcOpenMemHandle
hipKernelNameRef
hipLaunchByPtr
hipLaunchCooperativeKernel
hipLaunchCooperativeKernelMultiDevice
hipLaunchKernel
hipMalloc
hipMalloc3D
hipMalloc3DArray
hipMallocArray
hipMallocHost
hipMallocManaged
hipMallocMipmappedArray
hipMallocPitch
hipMemAdvise
hipMemAllocHost
hipMemAllocPitch
hipMemGetAddressRange
hipMemGetInfo
hipMemPrefetchAsync
hipMemPtrGetInfo
hipMemRangeGetAttribute
hipMemRangeGetAttributes
hipMemcpy
hipMemcpy2D
hipMemcpy2DAsync
hipMemcpy2DFromArray
hipMemcpy2DFromArrayAsync
hipMemcpy2DToArray
hipMemcpy2DToArrayAsync
hipMemcpy3D
hipMemcpy3DAsync
hipMemcpyAsync
hipMemcpyAtoH
hipMemcpyDtoD
hipMemcpyDtoDAsync
hipMemcpyDtoH
hipMemcpyDtoHAsync
hipMemcpyFromArray
hipMemcpyFromSymbol
hipMemcpyFromSymbolAsync
hipMemcpyHtoA
hipMemcpyHtoD
hipMemcpyHtoDAsync
hipMemcpyParam2D
hipMemcpyParam2DAsync
hipMemcpyPeer
hipMemcpyPeerAsync
hipMemcpyToArray
hipMemcpyToSymbol
hipMemcpyToSymbolAsync
hipMemcpyWithStream
hipMemset
hipMemset2D
hipMemset2DAsync
hipMemset3D
hipMemset3DAsync
hipMemsetAsync
hipMemsetD16
hipMemsetD16Async
hipMemsetD32
hipMemsetD32Async
hipMemsetD8
hipMemsetD8Async
hipMipmappedArrayCreate
hipMipmappedArrayDestroy
hipMipmappedArrayGetLevel
hipModuleGetFunction
hipModuleGetGlobal
hipModuleGetTexRef
hipModuleLaunchKernel
hipModuleLaunchKernelExt
hipModuleLoad
hipModuleLoadData
hipModuleLoadDataEx
hipModuleOccupancyMaxActiveBlocksPerMultiprocessor
hipModuleOccupancyMaxActiveBlocksPerMultiprocessorWithFlags
hipModuleOccupancyMaxPotentialBlockSize
hipModuleOccupancyMaxPotentialBlockSizeWithFlags
hipModuleUnload
hipOccupancyMaxActiveBlocksPerMultiprocessor
hipOccupancyMaxActiveBlocksPerMultiprocessorWithFlags
hipOccupancyMaxPotentialBlockSize
hipPeekAtLastError
hipPointerGetAttributes
hipProfilerStart
hipProfilerStop
hipRegisterActivityCallback
hipRegisterApiCallback
hipRemoveActivityCallback
hipRemoveApiCallback
hipRuntimeGetVersion
hipSetDevice
hipSetDeviceFlags
hipSetupArgument
hipSignalExternalSemaphoresAsync
hipStreamAddCallback
hipStreamAttachMemAsync
hipStreamBeginCapture
hipStreamCreate
hipStreamCreateWithFlags
hipStreamCreateWithPriority
hipStreamDestroy
hipStreamEndCapture
hipStreamGetFlags
hipStreamGetPriority
hipStreamIsCapturing
hipStreamQuery
hipStreamSynchronize
hipStreamWaitEvent
hipTexObjectCreate
hipTexObjectDestroy
hipTexObjectGetResourceDesc
hipTexObjectGetResourceViewDesc
hipTexObjectGetTextureDesc
hipTexRefGetAddress
hipTexRefGetAddressMode
hipTexRefGetArray
hipTexRefGetBorderColor
hipTexRefGetFilterMode
hipTexRefGetFlags
hipTexRefGetFormat
hipTexRefGetMaxAnisotropy
hipTexRefGetMipmapFilterMode
hipTexRefGetMipmapLevelBias
hipTexRefGetMipmapLevelClamp
hipTexRefGetMipmappedArray
hipTexRefSetAddress
hipTexRefSetAddress2D
hipTexRefSetAddressMode
hipTexRefSetArray
hipTexRefSetBorderColor
hipTexRefSetFilterMode
hipTexRefSetFlags
hipTexRefSetFormat
hipTexRefSetMaxAnisotropy
hipTexRefSetMipmapFilterMode
hipTexRefSetMipmapLevelBias
hipTexRefSetMipmapLevelClamp
hipTexRefSetMipmappedArray
hipUnbindTexture
hipWaitExternalSemaphoresAsync
hiprtcAddNameExpression
hiprtcCompileProgram
hiprtcCreateProgram
hiprtcDestroyProgram
hiprtcGetCode
hiprtcGetCodeSize
hiprtcGetErrorString
hiprtcGetLoweredName
hiprtcGetProgramLog
hiprtcGetProgramLogSize
